-- 租户表
CREATE TABLE IF NOT EXISTS `sys_tenant` (
  `id` BIGINT NOT NULL AUTO_INCREMENT COMMENT '租户ID',
  `tenant_code` VARCHAR(50) NOT NULL COMMENT '租户编码',
  `tenant_name` VARCHAR(100) NOT NULL COMMENT '租户名称',
  `contact` VARCHAR(50) COMMENT '联系人',
  `phone` VARCHAR(20) COMMENT '联系电话',
  `email` VARCHAR(100) COMMENT '邮箱',
  `address` VARCHAR(200) COMMENT '地址',
  `status` TINYINT NOT NULL DEFAULT 1 COMMENT '状态(0-禁用 1-启用)',
  `expire_time` DATETIME COMMENT '到期时间',
  `max_users` INT NOT NULL DEFAULT 10 COMMENT '最大用户数',
  `remark` VARCHAR(500) COMMENT '备注',
  `deleted` TINYINT NOT NULL DEFAULT 0 COMMENT '删除标记(0-未删除 1-已删除)',
  `created_by` BIGINT COMMENT '创建人',
  `created_time` DATETIME NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `updated_by` BIGINT COMMENT '更新人',
  `updated_time` DATETIME ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_tenant_code` (`tenant_code`, `deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='租户表';

-- 插入默认租户
INSERT INTO `sys_tenant` (`id`, `tenant_code`, `tenant_name`, `contact`, `phone`, `status`, `max_users`, `remark`)
VALUES (1, 'DEFAULT', '默认租户', '管理员', '13800138000', 1, 100, '系统默认租户');
